Philodendron Campii 'Lynette' L

Vendor: Plant Circle
Type: Home > All products > Plants
Price: 19.00

The Philodendron Campii ‘Lynette’ is a unique and eye-catching variety known for its long, narrow, and deeply ridged leaves that add a bold texture to any space. The glossy, deep green foliage grows in an upright, dense form, making it a striking and sculptural addition to your plant collection. Its resilient and easy-care nature makes it suitable for both seasoned collectors and beginners alike.

This philodendron thrives in bright, indirect light and prefers a warm, humid environment, making it perfect for adding a touch of tropical elegance to your home or office. Its distinct leaf structure and compact growth make ‘Lynette’ an excellent choice for those seeking an unusual yet easy-to-care-for plant.