Philodendron 'Dean McDowell' (gloriosum x pastazanum)

Vendor: Plant Circle
Type: Home > All products > Plants
Price: 34.00

The Philodendron ‘Dean McDowell’ is a striking hybrid born from the cross between the Philodendron gloriosum and Philodendron pastazanum, combining the best traits of both species. Its large, heart-shaped leaves boast a velvety texture with prominent veins, giving it an elegant, tropical look. The leaves emerge in a rich green hue with distinct white veins, making this plant a true statement piece for any collection. Known for its robust growth and hardier nature, the Philodendron ‘Dean McDowell’ is easier to care for compared to some of its more delicate relatives, thriving in bright, indirect light and high humidity environments.

This rare hybrid is highly sought after by collectors due to its unique appearance and manageable care requirements. Add the Philodendron ‘Dean McDowell’ to your collection for a bold, tropical touch.